
-- ---------------------------
-- 机器人表
-- ---------------------------
CREATE TABLE IF NOT EXISTS `__PREFIX__vbot_robot` (
  `id` int(10) unsigned NOT NULL AUTO_INCREMENT COMMENT 'ID',
  `name` varchar(50) NOT NULL DEFAULT '' COMMENT '机器人名称',
  `logo_image` varchar(100) NOT NULL DEFAULT '' COMMENT '机器人logo',
  `webhook` varchar(150) NOT NULL DEFAULT '' COMMENT 'Hook地址',
  `weigh` int(10) NOT NULL DEFAULT '0' COMMENT '权重',
  `openswitch` tinyint(1) NOT NULL DEFAULT '0' COMMENT '是否开启:0=否,1=是',
  `updatetime` int(10) DEFAULT NULL COMMENT '更新时间',
  `createtime` int(10) DEFAULT NULL COMMENT '创建时间',
  `deletetime` int(10) DEFAULT NULL COMMENT '删除时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=2 DEFAULT CHARSET=utf8 COMMENT='微信机器人表';

-- ----------------------------
-- 插入机器人
-- ----------------------------
BEGIN;
INSERT IGNORE INTO `__PREFIX__vbot_robot` VALUES ('1', '测试机器人', '', 'https://qyapi.weixin.qq.com/cgi-bin/webhook/send?key=92eb7c5b-4396-478d-a296-65e433a3568a', '1', '1', '1561962387', '1561962247', null);
COMMIT;

-- ----------------------------
-- 通知发送日志表
-- ----------------------------
CREATE TABLE IF NOT EXISTS `__PREFIX__vbot_msglog` (
  `id` int(10) unsigned NOT NULL AUTO_INCREMENT COMMENT 'ID',
  `robot_id` int(10) NOT NULL DEFAULT '0' COMMENT '发送机器人',
  `template_id` int(10) NOT NULL DEFAULT '0' COMMENT '通知模板',
  `template_data` text COMMENT '发送的数据',
  `errmsg` varchar(255) NOT NULL DEFAULT '' COMMENT '错误消息',
  `status` enum('1','0') NOT NULL DEFAULT '0' COMMENT '状态:0=失败,1=成功',
  `createtime` int(10) DEFAULT NULL COMMENT '发送时间',
  `deletetime` int(10) DEFAULT NULL COMMENT '删除时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=1 DEFAULT CHARSET=utf8 COMMENT='通知发送日志表';

-- ----------------------------
-- 通知消息模板表
-- ----------------------------
CREATE TABLE IF NOT EXISTS `__PREFIX__vbot_template` (
  `id` int(10) unsigned NOT NULL AUTO_INCREMENT COMMENT 'ID',
  `code` varchar(50) NOT NULL DEFAULT '' COMMENT '模板Code',
  `name` varchar(50) NOT NULL DEFAULT '' COMMENT '模板名称',
  `robot_ids` varchar(100) NOT NULL DEFAULT '0' COMMENT '发送机器人',
  `typelist` enum('news','image','markdown','text') NOT NULL DEFAULT 'text' COMMENT '消息类型:text=文本,markdown=markdown,image=图片,news=图文',
  `content` text DEFAULT NULL COMMENT '消息内容',
  `title` varchar(100) NOT NULL DEFAULT '' COMMENT '消息标题',
  `picurl_image` varchar(255) NOT NULL DEFAULT '' COMMENT '图片URL',
  `news` text DEFAULT NULL COMMENT '图文组',
  `at_mobiles` varchar(100) NOT NULL DEFAULT '' COMMENT '被AT人的手机号',
  `is_atall` tinyint(1) NOT NULL DEFAULT '0' COMMENT 'AT所有人:0=否,1=是',
  `openswitch` tinyint(1) NOT NULL DEFAULT '0' COMMENT '是否开启:0=否,1=是',
  `updatetime` int(10) DEFAULT NULL COMMENT '修改时间',
  `createtime` int(10) DEFAULT NULL COMMENT '创建时间',
  `deletetime` int(10) DEFAULT NULL COMMENT '删除时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=2 DEFAULT CHARSET=utf8 COMMENT='通知消息模板表';

-- ----------------------------
-- 插入一个初始模板
-- ----------------------------
BEGIN;
INSERT IGNORE INTO `__PREFIX__vbot_template` VALUES ('1', 'test_tpl', '测试模板', '1', 'markdown', '### 系统通知-测试消息\r\n###### ${test}\r\n###### 当前系统内有：${user_count}位用户\r\n###### Markdown 是一种标记语言\r\n###### Markdown 具有一系列衍生版本\r\n###### Markdown 的语法简洁明了\r\n###### 学习容易，而且功能比纯文本更强\r\n###### 调用时才赋值的变量值:${dynamic_variable}', '', '', '', '', '0', '1', '1562323284', '1562323284', null);
COMMIT;
-- ----------------------------
-- 模板变量表
-- ----------------------------
CREATE TABLE IF NOT EXISTS `__PREFIX__vbot_variable` (
  `id` int(10) unsigned NOT NULL AUTO_INCREMENT COMMENT 'ID',
  `name` varchar(50) NOT NULL DEFAULT '' COMMENT '变量名',
  `value_source` tinyint(1) NOT NULL DEFAULT '0' COMMENT '变量值来源:0=SQL查询结果,1=方法返回值',
  `sql` varchar(200) NOT NULL DEFAULT '' COMMENT 'SQL',
  `namespace` varchar(200) NOT NULL DEFAULT '' COMMENT '命名空间',
  `class` varchar(50) NOT NULL DEFAULT '' COMMENT '类',
  `function` varchar(50) NOT NULL DEFAULT '' COMMENT '方法',
  `params` varchar(100) NOT NULL DEFAULT '' COMMENT '参数',
  `updatetime` int(10) DEFAULT NULL COMMENT '更新时间',
  `createtime` int(10) DEFAULT NULL COMMENT '创建时间',
  `deletetime` int(10) DEFAULT NULL COMMENT '删除时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=3 DEFAULT CHARSET=utf8 COMMENT='模板变量表';

-- ----------------------------
-- 插入两个初始变量
-- ----------------------------
BEGIN;
INSERT IGNORE INTO `__PREFIX__vbot_variable` VALUES ('1', 'user_count', '0', 'SELECT count(id) as id FROM __PREFIX__user', '', '', '', '', '1562132190', '1562123868', null);
INSERT IGNORE INTO `__PREFIX__vbot_variable` VALUES ('2', 'test', '1', '', 'app\\admin\\controller\\vbot', 'Example', 'test', '我是传递过来的参数', '1562132323', '1562124050', null);
COMMIT;

-- ----------------------------
-- 旧版本增加字段处理
-- ----------------------------
BEGIN;
ALTER TABLE `__PREFIX__vbot_template` ADD COLUMN `code` varchar(50) NOT NULL DEFAULT '' COMMENT '模板Code' AFTER `id`;
COMMIT;

-- ----------------------------
-- 旧版本修改字段处理
-- ----------------------------
BEGIN;
ALTER TABLE `__PREFIX__vbot_template` MODIFY COLUMN `content` text DEFAULT NULL COMMENT '消息内容' AFTER `typelist`;
ALTER TABLE `__PREFIX__vbot_template` MODIFY COLUMN `picurl_image` varchar(255) NOT NULL DEFAULT '' COMMENT '图片URL' AFTER `title`;
ALTER TABLE `__PREFIX__vbot_msglog` MODIFY COLUMN `errmsg` varchar(255) NOT NULL DEFAULT '' COMMENT '错误消息' AFTER `template_data`;
ALTER TABLE `__PREFIX__vbot_variable` MODIFY COLUMN `sql` varchar(255) NOT NULL DEFAULT '' COMMENT 'SQL' AFTER `value_source`;
COMMIT;